WIRO OBSERVATORY WIRO PRIME FOCUS IMAGER Page __________

U.T. Date: _________ ___________ Observers: __________________________________ CCD: ____________________ ROI: _____________________

Plate Scale: ______________ Filters: ________ ________ ________ ________ ________ ________ ________ ________ ________ ________ ________ ________

File Name Object Exp.

Start U.T.

Start H.A.

Filter Airmass Focus Seeing Remarks

WIRO OBSERVATORY WIRO PRIME FOCUS IMAGER Page __________

U.T. Date: _________ ___________ Observers: __________________________________ CCD: ____________________ ROI: _____________________

Plate Scale: ______________ Filters: ________ ________ ________ ________ ________ ________ ________ ________ ________ ________ ________ ________

File Name Object Exp.

Start U.T.

Start H.A.

Filter Airmass Focus Seeing Remarks