home | pay | register | sign in | site map Search Advanced Search

Back to list of items

Business & Industrial > Healthcare, Lab & Life Science > Lab Supplies > Other Laboratory Supplies

1800 g/mm 500nm Diffraction Grating 50mm sq

Back in Stock! Perfect for building a Spectrohelioscope

Buyer or seller of this item?Sign in

View larger picture

Shipping costs: US $7.95 Standard Flat Rate Shipping Service Ships to: United States Item location: Ayer, Massachusetts, United States Quantity: 2 available History: Purchases

You can also: Watch this item Email to a friend

Show

Make no payments for 3 months with PayPal Buyer Credit. Good until 4/30/06. Subject to Credit approval. US residents only. See details | Apply now

Meet the seller

Seller:

buyrightauctions 646 )

Feedback: 100% Positive Member: since Jun-11-03 in United States Read feedback comments Ask seller a question Add to Favorite Sellers Store | List Visit seller’s Store:

BuyRightAuctions

Buy safely

Check the seller’s reputation

Read feedback comments Learn how you are protected

See eligibility

(revised)

ITEM DESCRIPTION

This grating is perfect for building your own spectrohelioscope.

SPECIFICATIONS

Material Float Glass Size Thickness 9.5 mm Dimensional Tolerance +/- 0.5mm Blaze Angle Dispersion (nm/mr) 0.50 Efficiency 65% at peak wavelength

Start new search

Buy It Now >

Overcoating None

See PDF file for typical efficiency curve.

ITEM CONDITION

Please note these are special order gratings and may take a few days to ship.

BUY RIGHT! BUY WITH CONFIDENCE!

BUY FROM BUYRIGHTAUCTIONS

View other similar items at :

Click Here

Terms & Conditions

Payment/Sales Tax: Pay with your credit card through PayPal. No other payment method is accepted. You must complete checkout and make payment within seven (7) days or the order will be revoked and the item will be relisted. We charge sales tax for shipments made to Massachusetts unless you provide a resale certificate.

Shipping: All US orders are shipped by UPS Ground from the factory in the Eastern US for a fixed shipping charge, including insurance against

Returns/Guarantees We will accept returns for a full refund of the purchase price (excluding shipping and handling charges) only if the item was not as described in the auction description. Buyer must return the item within ten (10) days and buyer is responsible for return shipping charges.

Unless otherwise indicated above, all products are sold AS IS without a guaranty or warranty on any kind.

Legal We are not the owner of the goods described in this auction listing. We are acting as the owner’s agent to facilitate the sale of these goods.

WE SPECIFICALLY DISCLAIM ANY IMPLIED WARRANTIES OF TITLE, MERCHANTABILITY, FITNESS FOR A PARTICULAR PURPOSE AND NON-INFRINGEMENT. Some states do not allow the disclaimer of implied warranties, so the foregoing disclaimer may not apply to you. This warranty gives you specific legal rights and you may also have other legal rights that vary from state to state.

OUR ENTIRE LIABILITY TO YOU OR ANY THIRD PARTIES UNDER ANY CIRCUMSTANCE IS LIMITED TO THE SALES PRICE OF THE RELEVANT GOODS AND $100. Some States do not allow the exclusion or limitation of incidental or consequential damages, so the above limitation or exclusion may not apply to you.

All text and images in this auction are Copyright Mercator Group LLC. All rights reserved.

FREE Counters and Services from Andale

Shipping, payment details and return policy

Shipping Cost Each Additional Item Services Available Available to US $7.95 + $3.00 Standard Flat Rate Shipping Service United States only

Shipping insurance Included in shipping and handling cost

Seller’s payment instructions Please email for shipping and handling charges outside the continental United States.

Payment methods accepted

This seller, buyrightauctions,prefers PayPal.

See More Great Items From This Seller

Hydrogen Alpha Telescope Filter 1.25" Prof Quality

US $79.00

1200 g/mm 500nm Diffraction Grating 50mm sq

US $135.00

Professional Telescope Filter Kit 1.25"

US $235.00

Holographic Grating 12.7 mm sq

US $79.99

Learn about payment methods

Ready to buy? help

1800 g/mm 500nm Diffraction Grating 50mm sq US $135.00 Your Quantity: x Buy It Now > Purchase this item now without bidding. Learn about Buy It Now.

What else can you do?

Back to list of items Ask seller a question Report this item Printer Version Seller assumes all responsibility for listing this item.

eBay Pulse eBay Reviews eBay Stores Half.com Kijiji PayPal Popular Searches ProStores Rent.com Shopping.com Skype Australia Austria China France Germany India Italy Spain United Kingdom About eBay Announcements Security Center Policies Site Map Help Privacy Policy.

eBay official time

1